-- 删除系统公告表
DROP TABLE IF EXISTS `cy_message_announcements`;

-- 删除用户通知表
DROP TABLE IF EXISTS `cy_message_notifications`;

-- 删除私信表
DROP TABLE IF EXISTS `cy_message_privates`;

-- 删除消息设置表
DROP TABLE IF EXISTS `cy_message_settings`;

-- 删除消息模板表
DROP TABLE IF EXISTS `cy_message_templates`;
